ripe-1

R I P E

Terms of Reference

Recognising that IP networks are growing beyond the LAN’s in Europe, and are extending over national and international WAN’s in Europe, the RIPE coordinating body has been created.

RIPE stands for the “Réseaux IP Europeens”.

The objective of RIPE is to ensure the necessary administrative and technical coordination to allow the operation and expansion of a pan-European IP network.

ffl RIPE acts as a forum for the exchange of technical information and the creation of expertise on IP networking.

ffl The area of relevance for RIPE is Europe.

ffl All parties operating wide area IP networks are encouraged to participate.

ffl RIPE promotes and coordinates interconnection of IP networks within Europe and to other continents.

ffl RIPE establishes agreement on common network management practices and the operational management of the interconnected networks.

ffl RIPE serves as a focal point for other common activities of the participants related to IP networking.

ffl All documents produced by RIPE will be publicly available.

ffl RIPE is not a network service provider. IP networks collaborating in RIPE remain under the executive authority of their respective organisations.

Amsterdam 29 November 1989